\hypertarget{structGstTensorRepoData}{}\doxysection{Gst\+Tensor\+Repo\+Data Struct Reference}
\label{structGstTensorRepoData}\index{GstTensorRepoData@{GstTensorRepoData}}


\mbox{\hyperlink{structGstTensorRepo}{Gst\+Tensor\+Repo}} internal data structure.  




{\ttfamily \#include $<$gsttensor\+\_\+repo.\+h$>$}

\doxysubsection*{Public Attributes}
\begin{DoxyCompactItemize}
\item 
Gst\+Buffer $\ast$ \mbox{\hyperlink{structGstTensorRepoData_ac402f52a0a6e3e76920272774b7342a5}{buffer}}
\item 
Gst\+Caps $\ast$ \mbox{\hyperlink{structGstTensorRepoData_a34b481acf5e143f5ccd0ca482ca33b34}{caps}}
\item 
G\+Cond \mbox{\hyperlink{structGstTensorRepoData_ac6256c0bde963132d2893346b049211a}{cond\+\_\+push}}
\item 
G\+Cond \mbox{\hyperlink{structGstTensorRepoData_aaf2d7e56031f2c92a9547e2d044b2d9d}{cond\+\_\+pull}}
\item 
G\+Mutex \mbox{\hyperlink{structGstTensorRepoData_a7f0cc83b576d63992157d8e47c72b7b8}{lock}}
\item 
gboolean \mbox{\hyperlink{structGstTensorRepoData_a35fe790cf8f93dcd4214faacd2367e9b}{eos}}
\item 
gboolean \mbox{\hyperlink{structGstTensorRepoData_a349d713f7064d86d5ff479a143fcd8bd}{src\+\_\+changed}}
\item 
guint \mbox{\hyperlink{structGstTensorRepoData_af7791c2fe23e43298e82d4ba274de357}{src\+\_\+id}}
\item 
gboolean \mbox{\hyperlink{structGstTensorRepoData_a1aabbbf05a8324ef974bd92fab5b741e}{sink\+\_\+changed}}
\item 
guint \mbox{\hyperlink{structGstTensorRepoData_a793113cc6d6c7ad746e10df6ed03b2b4}{sink\+\_\+id}}
\item 
gboolean \mbox{\hyperlink{structGstTensorRepoData_ad485b572545621f7959c9a863afd1a86}{pushed}}
\end{DoxyCompactItemize}


\doxysubsection{Detailed Description}
\mbox{\hyperlink{structGstTensorRepo}{Gst\+Tensor\+Repo}} internal data structure. 

\mbox{\hyperlink{structGstTensorRepo}{Gst\+Tensor\+Repo}} has G\+Slist of \mbox{\hyperlink{structGstTensorRepoData}{Gst\+Tensor\+Repo\+Data}}. 

Definition at line 40 of file gsttensor\+\_\+repo.\+h.



\doxysubsection{Member Data Documentation}
\mbox{\Hypertarget{structGstTensorRepoData_ac402f52a0a6e3e76920272774b7342a5}\label{structGstTensorRepoData_ac402f52a0a6e3e76920272774b7342a5}} 
\index{GstTensorRepoData@{GstTensorRepoData}!buffer@{buffer}}
\index{buffer@{buffer}!GstTensorRepoData@{GstTensorRepoData}}
\doxysubsubsection{\texorpdfstring{buffer}{buffer}}
{\footnotesize\ttfamily Gst\+Buffer$\ast$ Gst\+Tensor\+Repo\+Data\+::buffer}



Definition at line 42 of file gsttensor\+\_\+repo.\+h.

\mbox{\Hypertarget{structGstTensorRepoData_a34b481acf5e143f5ccd0ca482ca33b34}\label{structGstTensorRepoData_a34b481acf5e143f5ccd0ca482ca33b34}} 
\index{GstTensorRepoData@{GstTensorRepoData}!caps@{caps}}
\index{caps@{caps}!GstTensorRepoData@{GstTensorRepoData}}
\doxysubsubsection{\texorpdfstring{caps}{caps}}
{\footnotesize\ttfamily Gst\+Caps$\ast$ Gst\+Tensor\+Repo\+Data\+::caps}



Definition at line 43 of file gsttensor\+\_\+repo.\+h.

\mbox{\Hypertarget{structGstTensorRepoData_aaf2d7e56031f2c92a9547e2d044b2d9d}\label{structGstTensorRepoData_aaf2d7e56031f2c92a9547e2d044b2d9d}} 
\index{GstTensorRepoData@{GstTensorRepoData}!cond\_pull@{cond\_pull}}
\index{cond\_pull@{cond\_pull}!GstTensorRepoData@{GstTensorRepoData}}
\doxysubsubsection{\texorpdfstring{cond\_pull}{cond\_pull}}
{\footnotesize\ttfamily G\+Cond Gst\+Tensor\+Repo\+Data\+::cond\+\_\+pull}



Definition at line 45 of file gsttensor\+\_\+repo.\+h.

\mbox{\Hypertarget{structGstTensorRepoData_ac6256c0bde963132d2893346b049211a}\label{structGstTensorRepoData_ac6256c0bde963132d2893346b049211a}} 
\index{GstTensorRepoData@{GstTensorRepoData}!cond\_push@{cond\_push}}
\index{cond\_push@{cond\_push}!GstTensorRepoData@{GstTensorRepoData}}
\doxysubsubsection{\texorpdfstring{cond\_push}{cond\_push}}
{\footnotesize\ttfamily G\+Cond Gst\+Tensor\+Repo\+Data\+::cond\+\_\+push}



Definition at line 44 of file gsttensor\+\_\+repo.\+h.

\mbox{\Hypertarget{structGstTensorRepoData_a35fe790cf8f93dcd4214faacd2367e9b}\label{structGstTensorRepoData_a35fe790cf8f93dcd4214faacd2367e9b}} 
\index{GstTensorRepoData@{GstTensorRepoData}!eos@{eos}}
\index{eos@{eos}!GstTensorRepoData@{GstTensorRepoData}}
\doxysubsubsection{\texorpdfstring{eos}{eos}}
{\footnotesize\ttfamily gboolean Gst\+Tensor\+Repo\+Data\+::eos}



Definition at line 47 of file gsttensor\+\_\+repo.\+h.

\mbox{\Hypertarget{structGstTensorRepoData_a7f0cc83b576d63992157d8e47c72b7b8}\label{structGstTensorRepoData_a7f0cc83b576d63992157d8e47c72b7b8}} 
\index{GstTensorRepoData@{GstTensorRepoData}!lock@{lock}}
\index{lock@{lock}!GstTensorRepoData@{GstTensorRepoData}}
\doxysubsubsection{\texorpdfstring{lock}{lock}}
{\footnotesize\ttfamily G\+Mutex Gst\+Tensor\+Repo\+Data\+::lock}



Definition at line 46 of file gsttensor\+\_\+repo.\+h.

\mbox{\Hypertarget{structGstTensorRepoData_ad485b572545621f7959c9a863afd1a86}\label{structGstTensorRepoData_ad485b572545621f7959c9a863afd1a86}} 
\index{GstTensorRepoData@{GstTensorRepoData}!pushed@{pushed}}
\index{pushed@{pushed}!GstTensorRepoData@{GstTensorRepoData}}
\doxysubsubsection{\texorpdfstring{pushed}{pushed}}
{\footnotesize\ttfamily gboolean Gst\+Tensor\+Repo\+Data\+::pushed}



Definition at line 52 of file gsttensor\+\_\+repo.\+h.

\mbox{\Hypertarget{structGstTensorRepoData_a1aabbbf05a8324ef974bd92fab5b741e}\label{structGstTensorRepoData_a1aabbbf05a8324ef974bd92fab5b741e}} 
\index{GstTensorRepoData@{GstTensorRepoData}!sink\_changed@{sink\_changed}}
\index{sink\_changed@{sink\_changed}!GstTensorRepoData@{GstTensorRepoData}}
\doxysubsubsection{\texorpdfstring{sink\_changed}{sink\_changed}}
{\footnotesize\ttfamily gboolean Gst\+Tensor\+Repo\+Data\+::sink\+\_\+changed}



Definition at line 50 of file gsttensor\+\_\+repo.\+h.

\mbox{\Hypertarget{structGstTensorRepoData_a793113cc6d6c7ad746e10df6ed03b2b4}\label{structGstTensorRepoData_a793113cc6d6c7ad746e10df6ed03b2b4}} 
\index{GstTensorRepoData@{GstTensorRepoData}!sink\_id@{sink\_id}}
\index{sink\_id@{sink\_id}!GstTensorRepoData@{GstTensorRepoData}}
\doxysubsubsection{\texorpdfstring{sink\_id}{sink\_id}}
{\footnotesize\ttfamily guint Gst\+Tensor\+Repo\+Data\+::sink\+\_\+id}



Definition at line 51 of file gsttensor\+\_\+repo.\+h.

\mbox{\Hypertarget{structGstTensorRepoData_a349d713f7064d86d5ff479a143fcd8bd}\label{structGstTensorRepoData_a349d713f7064d86d5ff479a143fcd8bd}} 
\index{GstTensorRepoData@{GstTensorRepoData}!src\_changed@{src\_changed}}
\index{src\_changed@{src\_changed}!GstTensorRepoData@{GstTensorRepoData}}
\doxysubsubsection{\texorpdfstring{src\_changed}{src\_changed}}
{\footnotesize\ttfamily gboolean Gst\+Tensor\+Repo\+Data\+::src\+\_\+changed}



Definition at line 48 of file gsttensor\+\_\+repo.\+h.

\mbox{\Hypertarget{structGstTensorRepoData_af7791c2fe23e43298e82d4ba274de357}\label{structGstTensorRepoData_af7791c2fe23e43298e82d4ba274de357}} 
\index{GstTensorRepoData@{GstTensorRepoData}!src\_id@{src\_id}}
\index{src\_id@{src\_id}!GstTensorRepoData@{GstTensorRepoData}}
\doxysubsubsection{\texorpdfstring{src\_id}{src\_id}}
{\footnotesize\ttfamily guint Gst\+Tensor\+Repo\+Data\+::src\+\_\+id}



Definition at line 49 of file gsttensor\+\_\+repo.\+h.



The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
nnstreamer/elements/\mbox{\hyperlink{gsttensor__repo_8h}{gsttensor\+\_\+repo.\+h}}\end{DoxyCompactItemize}
